         180           8
  -1.11240895300741       -1.24029913041348       -1.36050161791126     
  -1.45100396816436       -1.57022294221890       -1.65233652592061     
  -1.73470012755358       -1.85714758042707     
 -0.565464794519071      -0.316084611104999      -6.131445165792843E-002
  0.178682105541856       0.457359256487315       0.701174595192837     
  0.993079414685121        1.28663177754583     
 -3.477002049851568E-003  0.000000000000000E+000
  0.992503051456559       0.000000000000000E+000
  0.995615208064553       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
