         180           8
  -1.07195873961429       -1.30121932656602       -1.42634177272853     
  -1.52230019532910       -1.60658616184468       -1.67042439466375     
  -1.70377303967648       -1.85102339877125     
 -0.520039680690833      -0.378983012271805      -0.120807881803581     
  0.127292603826215       0.387678277800006       0.640509724203847     
  0.879263369274083        1.18387383647527     
 -3.560344216375903E-003  0.000000000000000E+000
  0.992504393165340       0.000000000000000E+000
  0.995808058520555       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
