         180           3
   8.17827310745565        6.93919990107504        6.45201441260362     
   2.10442978165070        2.16294093490563        2.47798878410749     
 -3.193000388852348E-003  0.000000000000000E+000
   1.00215274037351       0.000000000000000E+000
  0.998787301437436       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
