         180           8
  -5.13874233988267       -5.63319396709461       -5.94468165544120     
  -6.24300588845321       -6.42782483189375       -6.62755380004099     
  -6.82405043297691       -6.97890684080899     
  8.870745994970571E-002 -9.652647306949626E-002 -0.258443258423282     
 -0.407107716672462      -0.508334067432747      -0.508732473391635     
 -0.465833384982107      -0.506682301645789     
 -3.815309972164714E-003  0.000000000000000E+000
  0.992841683186860       0.000000000000000E+000
  0.995776734916746       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
