         180           8
   8.00588683848699        7.61502865235070        7.20386678473994     
   6.79671969904293        6.58754459344257        6.36611724667236     
   6.09146281627203        6.11394705637932     
   2.71100141596674        2.53074807115826        2.40471427088205     
   2.28625497460008        2.26599342372927        1.82718214855361     
   1.46238812211063        1.21303748230356     
 -3.110913627953041E-003  0.000000000000000E+000
   1.00241510342627       0.000000000000000E+000
  0.998902672166579       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
