         180           8
  -4.95467146047746       -5.19940275453984       -5.50914334967062     
  -5.79049146870881       -6.04183517986020       -6.30455246272723     
  -6.58973575002184       -6.78486552134184     
  0.276881837832244       0.104439222406488      -0.180892361164559     
 -0.370863776678652      -0.501823616324589      -0.933775755020870     
  -1.32193365743002       -1.18329020295129     
 -3.889793461434744E-003  0.000000000000000E+000
  0.993089525700349       0.000000000000000E+000
  0.995926087571110       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
