         180           3
   8.04207539949448        6.57141903635399        5.93749262911165     
   1.97756450857072        2.33140938329689        1.31127148668312     
 -3.182867321526701E-003  0.000000000000000E+000
   1.00228185034522       0.000000000000000E+000
  0.998766929468243       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
