         180           8
  -2.35842881085326       -2.45277869607656       -2.49433369420500     
  -2.58400279010341       -2.68414180996440       -2.75891231223343     
  -2.84618112876020       -2.97290035117189     
 -9.814240037797106E-002  7.059443010894237E-002  0.850965878392424     
   1.70242363766715        2.46316541439851        3.19275008804455     
   3.90900461984335        4.71129570269233     
 -3.599186360521020E-003  0.000000000000000E+000
  0.992644512630763       0.000000000000000E+000
  0.995617640654576       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
