         180           8
  0.273241305690432       -1.62285220056702       -2.97416053724792     
  -1.80368966772352       0.853632167719260      -0.831162579083650     
  -4.24135616296697       -4.17045117734451     
  0.883571989496127        2.76141546432400        4.59269745326025     
   4.14178061189559       -1.44583361438543       -1.69012853082035     
   5.60063370323561        6.05244878363677     
  3.011875364693795E-003  0.000000000000000E+000
  0.994079491265994       0.000000000000000E+000
  0.989179866280393       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
