         180           3
   7.94082042060670        9.62225959240431        11.6119866640507     
  0.400906850063594        1.00090490247601        1.66300253880798     
 -2.821616167760111E-003  0.000000000000000E+000
   1.00212043575668       0.000000000000000E+000
  0.998655152296128       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
