         180           8
  0.667492932969582      -0.734392306083633      -0.310478858331698     
   2.17157486627630        1.33125167945213       0.873608020741156     
 -0.321860618707606       -2.33817462597584     
   1.51439947817847        2.99930243635489        2.72647481339667     
 -0.147153145551792       -2.32319037225406       -3.24409782799573     
   1.75885891956904        4.12317243018726     
  1.889069820378450E-003  0.000000000000000E+000
  0.991968293418851       0.000000000000000E+000
  0.991141250642434       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
