         180           8
 -0.446491031703782      -0.561417262889278      -0.677345050244192     
 -0.737059983890881      -0.838232396226827      -0.919927412176750     
 -0.996259816733433       -1.03873051188772     
 -0.555108012738703      -0.287693750280599      -4.161987305249491E-002
  0.234588870808117       0.504664981717932       0.810191697560069     
   1.02504589843376        1.18133553459102     
 -3.730736428697697E-003  0.000000000000000E+000
  0.992804295071063       0.000000000000000E+000
  0.996065402417607       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
