         180           8
  0.115671560983866      -3.157985370310487E-002 -0.193701606277478     
 -0.297616363905943      -0.383672602074329      -0.490599487672648     
 -0.598301346974009      -0.727882589269530     
   2.59262214867229        3.12909741105296        3.76289575998364     
   4.39912931680857        4.99279469237861        5.58091518284253     
   6.23149826939128        6.82673401878524     
 -3.660471661420824E-003  0.000000000000000E+000
  0.992921285059861       0.000000000000000E+000
  0.996056026659281       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
