         180           8
 -0.271354774706046      -0.422582726419727      -0.513279852667564     
 -0.587891666861827      -0.738698223089486      -0.819499111759372     
 -0.852169285768400      -0.936610767711081     
 -0.882693119927201      -0.656759558134758      -0.374874761614350     
 -2.734735769609063E-002  0.288372538982842       0.548900103810628     
  0.787025259517559        1.07125749804195     
 -3.719527298464061E-003  0.000000000000000E+000
  0.992835796254443       0.000000000000000E+000
  0.996114253954442       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
