         180           8
   7.87327086475681        7.42765428438696        7.14499333630660     
   6.91972726245651        6.72473901844505        6.58370983510346     
   6.46953058711962        6.38456828221612     
   2.08124494550099        2.04456988297918        2.01439295128402     
   1.97976722897457        1.99028836516290        2.10445165583084     
   2.21746576593228        2.29064035850769     
 -3.142315748811878E-003  0.000000000000000E+000
   1.00194981869730       0.000000000000000E+000
  0.998619804103968       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
