         180           8
  -4.43811030956560       -4.79680232530030       -5.12250108719079     
  -5.41431801833561       -5.64445425720356       -5.82593414542209     
  -6.00620891541226       -6.06678551194079     
 -0.300727404924821      -0.462264313831418      -0.635613077740257     
 -0.793966856978971      -0.917624635791411      -0.951724571048985     
 -0.921718687156833      -0.971640410821682     
 -3.889369148765489E-003  0.000000000000000E+000
  0.992643405983306       0.000000000000000E+000
  0.995888371969020       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
