         180           8
   6.90501322870670        6.50718851484045        6.17398705482871     
   5.81849695848456        5.52589424512018        5.29544032621517     
   5.10174091706165        4.97329908306216     
  -36.7901718977824       -37.0266571875217       -37.2899219044899     
  -37.5694862484850       -37.8335615691452       -37.9680153061421     
  -38.1268253316279       -38.4596764780626     
 -4.059120809781221E-003  0.000000000000000E+000
  0.993148498815571       0.000000000000000E+000
  0.996754656220082       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
