         180           8
   6.57532516037833        6.19895967627537        5.85712700894975     
   5.53440444805300        5.25788831955947        5.01393475664587     
   4.84082898956634        4.79098281558414     
  -37.3675613632483       -37.6534573100358       -37.9060350092512     
  -38.1507868552001       -38.4090064562576       -38.6119052631928     
  -38.8059317365529       -39.1680552311655     
 -4.084828416110802E-003  0.000000000000000E+000
  0.992909563574383       0.000000000000000E+000
  0.996378667215149       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
