         180           8
   6.50113970924713        6.09464363127671        5.72053203648547     
   5.41378363757719        5.16430978097834        4.93365817279433     
   4.76550348449999        4.73853751782740     
  -37.1937186715766       -37.5237923749229       -37.8261110626769     
  -38.1672508075677       -38.5039594835688       -38.7592210021532     
  -39.0053392356657       -39.3488635552917     
 -4.133025800588611E-003  0.000000000000000E+000
  0.993110957787965       0.000000000000000E+000
  0.996539748018043       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
