         180           8
   2.59226178024376        2.25090964104920        1.99280305796455     
   1.75365274770987        1.58623951882634        1.41486205482033     
   1.27976794631716        1.25224268242600     
  -36.1064990023435       -36.4097299877660       -36.5788061422725     
  -36.7730031616686       -36.9346952882532       -37.1135831055515     
  -37.3488055128392       -37.4902015595406     
 -4.381251125900284E-003  0.000000000000000E+000
  0.993149592702955       0.000000000000000E+000
  0.996621182077138       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
