         180           3
   6.03478525839602        4.66660342263181        4.20626308689579     
 -8.329997676436413E-002 -0.610876642230832      -0.332926919408281     
 -3.011499924830876E-003  0.000000000000000E+000
   1.00153131973588       0.000000000000000E+000
  0.998590573473128       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
