         180           8
   3.78508402031845        3.46014968253798        3.17201554051896     
   2.92213059677598        2.68972435578189        2.48341524645447     
   2.38271978838010        2.25691599838634     
  -36.5852867885385       -36.6501998539407       -36.8078438875552     
  -37.0879479157958       -37.4044909262461       -37.6176821674927     
  -37.9115433586059       -38.1452527966543     
 -4.364481084288356E-003  0.000000000000000E+000
  0.993391499684432       0.000000000000000E+000
  0.996766924145290       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
