         180           8
   7.05721623013610        6.91410623576325        6.76742950605240     
   6.69551243843602        6.60551509065698        6.49541313216353     
   6.43429594542447        6.25784604423454     
  -35.7580721154718       -35.5742393911829       -35.2603795567457     
  -34.9326745930886       -34.5489615074480       -34.1326485139948     
  -33.6817373077157       -33.2892690267165     
 -3.950392319672738E-003  0.000000000000000E+000
  0.992960826213467       0.000000000000000E+000
  0.996639430047853       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
