         180           3
   7.01091365906810        5.56303721938300        4.86432996071918     
  0.866091814090832        1.03463761839271        1.04657506724090     
 -3.217860467949412E-003  0.000000000000000E+000
   1.00155059854545       0.000000000000000E+000
  0.998562434357366       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
