         180           8
   2.45017383696662        2.18537737191120        1.95302437497912     
   1.68861707329639        1.50075819791316        1.42318679746385     
   1.33896002022923        1.29684572025519     
  -34.9130087467284       -35.0891770352206       -35.2395511079067     
  -35.4476886258780       -35.6575838661618       -35.8105973347518     
  -35.9946384270811       -36.1163009473247     
 -4.142317556693017E-003  0.000000000000000E+000
  0.992909168930446       0.000000000000000E+000
  0.996451947198138       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
