         180           3
   6.44875553319632        4.78493007162442        3.79422312878632     
  0.131004455921718       0.280504315651562       0.299782200736867     
 -2.927374923554222E-003  0.000000000000000E+000
   1.00158336843852       0.000000000000000E+000
  0.998622069435344       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
