         180           8
   4.48214387350971        4.17021569512755        3.86218456531960     
   3.61366100465573        3.41210772010005        3.26084679743288     
   3.18104974075511        2.95984003613631     
  -34.9462072228850       -35.2173895962850       -35.4916610464738     
  -35.8092578942723       -36.1212970721715       -36.4072561337353     
  -36.6642704694319       -37.5744812686936     
 -4.061261654277204E-003  0.000000000000000E+000
  0.993181226322714       0.000000000000000E+000
  0.996693315054531       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
