         180           8
   6.08664971938208        5.66966200576184        5.36765303839444     
   5.08146890898719        4.80499606329943        4.54818980778235     
   4.37266092043843        4.38154385075621     
  -35.6868828443317       -35.9451735282157       -36.1624974647682     
  -36.4007059290569       -36.6387093164602       -36.8636166232820     
  -37.0962625311821       -37.4237038039535     
 -3.836967186252805E-003  0.000000000000000E+000
  0.993235195447608       0.000000000000000E+000
  0.996433695588063       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
