         180           8
   6.11541333146306        5.75508647222101        5.37798479648702     
   5.06659082644282        4.80340815053824        4.56852963069442     
   4.42164042533307        4.34632772879047     
  -35.7287269487033       -36.0836616174244       -36.2918077587621     
  -36.5605531335925       -36.8896147858795       -37.1540842531442     
  -37.3800552319546       -37.6704799766206     
 -3.843532150805896E-003  0.000000000000000E+000
  0.993147429068972       0.000000000000000E+000
  0.996425447969240       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
