         180           8
   6.17997973597671        6.08435597327283        5.93966056407395     
   5.83072970404964        5.70243391180708        5.57576944998860     
   5.48157757222268        5.40058267042798     
  -34.3988867933429       -34.1747454568286       -33.8278602007788     
  -33.4630486788108       -33.0922168261117       -32.6956227870130     
  -32.2964325138969       -31.9903586849015     
 -3.458792630714594E-003  0.000000000000000E+000
  0.992393009877675       0.000000000000000E+000
  0.995494900706681       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
