         180           8
   1.86977389757380        1.51739315078694        1.31210942697895     
   1.11522387089617       0.933524234916985       0.792390607916347     
  0.696409409183095       0.502758737608957     
  -33.4679530314932       -33.7128964630335       -33.9606549184815     
  -34.2141859676962       -34.4037808999090       -34.5220546518750     
  -34.6803541631296       -34.7437568167321     
 -3.638651718528944E-003  0.000000000000000E+000
  0.993564576841419       0.000000000000000E+000
  0.994414507125181       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
