         180           8
   2.10469990338310        1.84208728724382        1.54214026498075     
   1.33083862309170        1.16737810613983        1.08558976213225     
   1.02622894441960       0.884347623409199     
  -34.2432178924140       -34.4553519039546       -34.6845808292236     
  -34.9262841401053       -35.0719456140456       -35.1814453440563     
  -35.3182081138331       -35.4279872453831     
 -3.756693488950244E-003  0.000000000000000E+000
  0.992253803597767       0.000000000000000E+000
  0.995618120752652       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
