         180           8
   3.24718059449301        2.84113779986548        2.57901660570453     
   2.34929835887899        2.10788239209359        1.93151685684943     
   1.83408898451984        1.57626655584700     
  -34.4359731377525       -34.5210030109036       -34.7796785725484     
  -35.0928186914899       -35.4631799221128       -35.7481280644417     
  -36.1794333248097       -36.8587612655363     
 -3.821541063843773E-003  0.000000000000000E+000
  0.992491137609715       0.000000000000000E+000
  0.995927641770537       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
