         180           8
   6.40123267949461        6.19283032854349        6.04300186229797     
   5.90408238629283        5.77967100119950        5.66621498416793     
   5.54161441462602        5.44745836057740     
  -35.3910952693078       -35.2117152175878       -34.9256884661662     
  -34.5849538283858       -34.2332195766050       -33.8598018152529     
  -33.4808642927242       -33.0749428628406     
 -3.675067078061427E-003  0.000000000000000E+000
  0.992352207518226       0.000000000000000E+000
  0.995779021339364       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
