         180           8
   6.24476919888396        6.10763895611443        5.97399075772852     
   5.86953493451611        5.74071419607064        5.61216394253174     
   5.54768340515956        5.39351457164607     
  -35.4627072526175       -35.2383603240944       -34.9543291533891     
  -34.5902765773486       -34.2705002656247       -34.0765935560700     
  -33.7740663678773       -33.3113769169630     
 -3.813217896956779E-003  0.000000000000000E+000
  0.992830394048160       0.000000000000000E+000
  0.996187221350092       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
