         180           8
  0.986851288895094       0.699123931950172       0.509990579589755     
  0.367588393655000       0.202860532114980       6.106817035279399E-002
  6.716164730273294E-003 -6.016362251879102E-002
  -34.3318244803527       -34.5243276661230       -34.5921775200855     
  -34.7127044448131       -34.9105437109607       -35.0181483395723     
  -35.1052666689688       -35.2303739998761     
 -4.059181942619511E-003  0.000000000000000E+000
  0.992796628050663       0.000000000000000E+000
  0.996013404207963       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
