         180           3
   6.29267202321839        4.86597642941120        4.26026159428743     
   1.81378175040686       0.473438031292073       0.821118193097074     
 -3.040336409654276E-003  0.000000000000000E+000
   1.00166395247879       0.000000000000000E+000
  0.998314602118884       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
