         180           8
   3.26129337352263        2.96267811935734        2.64802322243124     
   2.38651193046030        2.13059467132138        1.99114295451984     
   1.92794326283359        1.76175510319282     
  -34.1420824743268       -34.5824556029857       -35.0526991836444     
  -35.4655523682839       -35.8176156432652       -36.1417967277654     
  -36.4386235132236       -36.6158527815251     
 -4.025662563752338E-003  0.000000000000000E+000
  0.993032374251725       0.000000000000000E+000
  0.996294949608153       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
