         180           8
   7.29135092805242        7.15637346869297        7.04798045516146     
   6.91714972510553        6.78557409420819        6.67776076519425     
   6.59647128012172        6.34327209165315     
  -33.3640939933510       -32.6849056137687       -32.0184797645912     
  -31.2762481352576       -30.5004179553027       -29.7871883964433     
  -29.0184298759104       -28.2904048225448     
 -3.786175105687638E-003  0.000000000000000E+000
  0.992775822582564       0.000000000000000E+000
  0.996074589277194       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
