         180           8
   7.01461681526994        6.89762887493996        6.84459896370939     
   6.78170016075610        6.64880277090653        6.65020618026258     
   6.63668872451495        6.40829678644076     
  -35.5882136400671       -35.4934665377140       -35.0592688907795     
  -34.6576791177707       -34.0458021920606       -32.9697161196904     
  -32.1697754788438       -31.3239306744033     
 -3.685307455438105E-003  0.000000000000000E+000
  0.992310358007538       0.000000000000000E+000
  0.996297173313936       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
