         180           8
   7.00471065175301        6.84859775450929        6.69075239911689     
   6.56225041703150        6.44887645713546        6.35492367678581     
   6.26404515722085        6.16416281052794     
  -35.8863344970064       -35.5660745613386       -35.3937855893632     
  -35.0865125585615       -34.6004561389498       -34.1642739012698     
  -33.8076411503732       -33.4230592924033     
 -3.894149950862687E-003  0.000000000000000E+000
  0.992793507296921       0.000000000000000E+000
  0.996153351361126       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
