         180           8
   6.88865105557637        6.66612645283544        6.55855832077245     
   6.45689737079762        6.35547571318921        6.25435066370614     
   6.17622875601557        5.92936541164422     
  -35.9165062215492       -35.7615479294628       -35.4540149199950     
  -35.0707186124777       -34.6581466411846       -34.2594481793528     
  -33.7406443796593       -33.3869851476501     
 -3.744447457746170E-003  0.000000000000000E+000
  0.992841793124086       0.000000000000000E+000
  0.996048096031846       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
