         180           3
   6.40195494962341        4.64589287249520        3.59992288251667     
  0.373875171970022       0.351529200579860      -9.314058856306083E-002
 -2.938935420611980E-003  0.000000000000000E+000
   1.00174390603797       0.000000000000000E+000
  0.998552461950456       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
