         180           8
   7.51043227092346        7.25067817143580        7.08851472238425     
   6.95575750588960        6.82802516499774        6.68062413311350     
   6.53441773735619        6.39899379618556     
  -32.4204799293502       -31.8313865102818       -31.0911393865830     
  -30.3647870179397       -29.6387186585003       -28.8760969934786     
  -28.1329778025384       -27.3829183665851     
 -3.732677004658026E-003  0.000000000000000E+000
  0.992769797600574       0.000000000000000E+000
  0.995971317627465       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
