         180           8
   7.18366497888023        6.99833768021695        6.86952654261870     
   6.69344202803579        6.58732835486841        6.50317099646426     
   6.40967773051012        6.28743242564720     
  -35.7389712758635       -35.4650880683417       -35.1860004837950     
  -34.8877921720211       -34.3630730357099       -33.4043649669602     
  -32.4416980179774       -31.4522474825958     
 -3.791830131017410E-003  0.000000000000000E+000
  0.992600770557311       0.000000000000000E+000
  0.996004468913001       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
