         180           8
   10.1443321527904        9.55764181100472        8.85523942857803     
   8.16987141229884        7.58776423582119        7.03801442251555     
   6.45891046633660        5.93261271605000     
  -31.2750287954212       -31.3475388900304       -31.4883151225721     
  -31.6421492601235       -31.7860714587573       -31.9928279095576     
  -32.2639401972754       -32.5481771821635     
 -4.058735737590056E-003  0.000000000000000E+000
  0.993297244325139       0.000000000000000E+000
  0.996407382525705       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
