         180           8
   3.14716866126649        2.99872615021798        2.73486467011641     
   2.52415420679753        2.32082991665158        2.14633060304960     
   2.00551606412354        1.91978937359592     
  -34.4560282007143       -34.6809733128399       -34.9541890376565     
  -35.2241304744470       -35.4175000008647       -35.5781154331662     
  -35.7470330110483       -36.0059838264960     
 -4.112674451898809E-003  0.000000000000000E+000
  0.993236415526976       0.000000000000000E+000
  0.996343117322998       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
