         180           8
   14.2802563131875        13.6824073623028        13.1101124460326     
   12.5110471653636        11.9242700286412        11.3372930220279     
   10.7343853948221        10.1174881406830     
  0.150066088363762       0.271468562798216       0.450751750904279     
  0.568234025590654       0.645473371179882       0.784821550312392     
  0.930105525434808        1.02252186647975     
 -2.733538683234616E-003  0.000000000000000E+000
   1.00190403847853       0.000000000000000E+000
  0.998745940457112       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
