         180           2
   14.2732953185781        10.1154038878932     
  0.325130564698459        1.07382624270856     
 -2.714613700458971E-003  0.000000000000000E+000
   1.00190818331691       0.000000000000000E+000
  0.998687317554655       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
