         180           8
   10.0165395148172        9.29407035438797        8.68739918471479     
   8.07117700345646        7.46108096884824        6.91261163614436     
   6.36636309188539        5.80173778480017     
  -30.9293668614301       -31.1168600480868       -31.1956518983908     
  -31.3550916533748       -31.5651213945967       -31.8412669037829     
  -32.1024361455524       -32.4900930275543     
 -4.051293708647942E-003  0.000000000000000E+000
  0.993060130355633       0.000000000000000E+000
  0.996235550677802       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
